05101520253035401.0 1031.5 1032.0 1032.5 1033.0 103Zinc, Z=30, soft X-ray near-edge region

New Result

Chantler (1995)

Henke (1988) f"

Scofield f2

Experiment (f2) f

2 e/atomE [eV]