Mean 0.9972 RMS 0.1005

true / p track p 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Tracks/0.02

0 20 40 60 80 100 120 140 160 180 200 310 ×

Mean 0.9975 RMS 0.07709

all tracks

quality tracks from pions